Alexandra, queen — ܐܠܟܣܢܕܪܐ ܡܠܟܬܐ
edition published: 2016-08-17-04:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

ܐܠܟܣܢܕܪܐ ܡܠܟܬܐ; Alēksandrā malkthā; Alexandra, queen; ʾĀlēḵsandrā malḵṯā; la reine Alexandra
identifier: http://syriaca.org/person/1850
Alexandra, queen is commemorated in George the Martyr, Antony the Soldier, and Alexandra the Queen (text), a work surviving in at least 14 manuscripts including ms Berlin, Königliche Bibliothek, syr. 75 (Sachau 222), f. 226-234v.
event: Alexandra, queen is commemorated in George the Martyr, Anthony the General, and Alexandra the Queen (text).
event: Alexandra, queen is commemorated in George, Antonius the Soldier (text).
Bibliotheca Hagiographica Syriaca 28 865